 Our main function starts like this: 

\footnotesize\begin{verbatim}\end{verbatim}
\normalsize
 First we create a object {\tt t} of the {\bf Test}{\rm (p.\,\pageref{classTest})} class. 

\footnotesize\begin{verbatim}\end{verbatim}
\normalsize
 Then we call the example member function 

\footnotesize\begin{verbatim}\end{verbatim}
\normalsize
 After that our little test routine ends. 

\footnotesize\begin{verbatim}\end{verbatim}
\normalsize
 